Contrib. Astron. Obs. Skalnaté Pleso 49, 85 – 96, (2019)

(Very) Fast astronomical photometry for meter-class telescopes

L. Zampieri^1, G. Naletto^2, C. Barbieri^{1,2}, A. Burtovoi^{1,2}, M. Fiori^2, A. Spolon^2, P. Ochner^2, L. Lessio^1, G. Umbriaco^2 and M. Barbieri^3 1 INAF-Astronomical Observatory of Padova, Italy (E-mail: luca.zampieri@inaf.it) 2 University of Padova, Italy 3 University of Atacama, Chile

Received: December 2, 2018; Accepted: January 30, 2019

Abstract. Our team at the INAF-Astronomical Observatory of Padova and the University of Padova is engaged in the design, construction and operations of instruments with very high time accuracy in the optical band for applications to High Time Resolution Astrophysics and Quantum Astronomy. Two instruments were built to perform photon counting with sub-nanosecond temporal accuracy, Aqueye+ and Iqueye. Aqueye+ is regularly mounted at the 1.8m Copernicus telescope in Asiago, while Iqueye was mounted at several 4m class telescopes around the world and is now attached through the Iqueye Fiber Interface to the 1.2m Galileo telescope in Asiago. They are used to perform coordinated high time resolution optical observations and, for the first time ever, experiments of optical intensity interferometry on a baseline of a few kilometers. We report on recent technological developments and scientific results obtained within the framework of this project.

Key words: Astronomical instrumentation, methods and techniques – Instrumentation: photometers – Techniques: interferometric – Occultations – pulsars: general – pulsars: individual: PSR J0534+2200 – X-rays: binaries – X-rays: individual: MAXI J1820+070

1. Introduction

The origin of the AQUEYE+IQUEYE project^1 dates back to September 2005, when we completed an instrument design study (QuantEYE, the ESO Quantum Eye; Dravins et al. 2005) within the framework of the proposal for new instrumentation for the 100 m diameter Overwhelmingly Large (OWL) telescope. The main objective of the study was to demonstrate the possibility to reach picosecond time resolution in the optical band, needed to bring Quantum Optics concepts into the astronomical domain. We had two main scientific goals in mind: measuring the entropy of light through the statistics of the photon arrival times and performing optical High Time Resolution Astrophysics with sub-ms time resolution.

1https://web.oapd.inaf.it/zampieri/aqueye-iqueye/index.html

Starting from the QuantEYE design, we realized two similar instruments, Aqueye+ and Iqueye. They are non-imaging photon-counting instruments dedicated to performing very fast optical photometry, with a field of view of few arcsec and the capability of time tagging the detected photons with sub-ns time accuracy. This instrumentation is extremely versatile because the photon event lists are stored in a mass memory and the data analysis is entirely done in post-processing with a selection of time bins (from nanoseconds to minutes). In addition, simultaneous observations with distant telescopes can be made, because a suitable synchronization of the signals is implemented. This fact allows us to correlate the simultaneous acquisitions from the two instruments.

The first instrument that was realized is Aqueye, the Asiago Quantum Eye, mounted on the AFOSC instrument at the Copernicus telescope in Asiago (Barbieri et al., 2009). The second step was Iqueye, the Italian Quantum Eye, designed for applications to 4 m class telescopes (Naletto et al., 2009). It was mounted on the ESO 3.5 m New Technology Telescope in La Silla, and the Telescopio Nazionale Galileo and the William Herschel Telescope in La Palma.

In 2014 Aqueye become an independent instrument, called Aqueye+ and no longer attached to AFOSC (Naletto et al., 2013). It is now remotely controlled and regularly mounted at the 1.8 m Copernicus telescope in Asiago (Zampieri et al., 2015). The acquisition electronics was moved to a dedicated room and is kept under stable temperature and humidity conditions. In 2015 Iqueye returned to Asiago for a general refurbishment and was mounted at the 1.2 m Galileo telescope to perform experiments of intensity interferometry (Zampieri et al., 2016). A direct mount at the Cassegrain focus was soon discarded because of potential mechanical problems. We opted for a soft-mount solution, installing a dedicated optical bench at the Nasmyth focus of the Galileo telescope and connecting Iqueye to it through an optical fiber.

Since 2015 the two instruments have been used to perform coordinated high time resolution optical observations and, for the first time ever, exploratory experiments of stellar intensity interferometry on a baseline of a few kilometers. Some of the results obtained within the framework of these programs are reported here.

2. Instrumentation

Both instruments, Aqueye+ and Iqueye, adopt a very convenient optical design (Barbieri et al. 2009; Naletto et al. 2009). The detectors are Single Photon Avalanche Photodiodes (SPADs), photon counting detectors with high quantum effciency (∼ 50%) and very high time resolution (30-50 ps), but rather small effective area. To better couple the small detectors effective area to the telescope pupil and to increase the maximum sustainable count rate, Aqueye+ and Iqueye implement the same concept of splitting the telescope entrance pupil proposed for QuantEYE. The pupil is divided in four parts, each of them focused on a single detector.

The core of the instrumentation is its very accurate acquisition and timing system. The instruments time tag and store the arrival time of each detected photon with a ≃ 100 ps relative time accuracy and < 500 ps absolute time accuracy (compared to UTC; Naletto et al. 2009). All recorded times are stored in event lists that can be analyzed in post-processing (Zampieri et al. 2015). At present the most important limitation is the maximum data rate, of the order of few MHz (in the linear regime).

3. Interfacing the instruments with optical fibers

In order to connect Iqueye to the 1.2 m Galileo telescope, we were forced to opt for a soft-mount solution. To avoid potential problems related to the mechanics of the telescope, we installed a dedicated optical bench at the telescope lateral focus and connected Iqueye to it by means of an optical fiber (Zampieri et al., 2016). Besides facilitating the mounting of the instrument, this solution has also the advantage of maintaining Iqueye in a separate room under controlled temperature and humidity conditions (reducing potential systematics related to varying ambient conditions). At the same time, it mitigates scheduling requirements related to the time needed to mount and dismount the instrument.

Since 2015, the bench has been modified and upgraded, becoming an indepedent instrument, the Iqueye Fiber Interface (IFI; Figure 1). The alignment, focusing and overall optical efficiency of IFI (including the optical fiber) have been tested in the laboratory. Taking into account the loss on the beam splitter (that re-directs 8% of the light to the field camera) the total transmittance efficiency is ∼ 80%. At present, IFI can be mounted and used independently for fiber-coupling also other instruments and/or performing imaging and photometry with the field camera.

Building on the experience gained with IFI, a parallel work for the implementation of an optical fiber interface is under way also for Aqueye+. In this case, the main purpose is to trigger a prompt use of Aqueye+ in the ToO mode for targeting transient or short duration events. As for Iqueye, this solution has also the advantage of maintaining Aqueye+ in a dedicated, thermally controlled room in the telescope dome. The final solution adopted for fiber-coupling Aqueye+ is different from that of Iqueye, because the Nasmyth focus of the Copernicus telescope is not available. After considering other possibilities (Zampieri et al., 2016), eventually we opted for positioning an optical fiber directly at the telescope focal plane, exploiting the mechanical support provided by AFOSC and the telescope field camera for pointing and guiding. This activity is still ongoing.

For both instruments, a major concern is the efficiency of the optical coupling. In this respect, a crucial problem to face is to minimize the losses when

88 L. Zampieri et al.

Figure 1. Top: Iqueye Fiber Interface (IFI). Opto-mechanical interface for coupling Iqueye with the 1.2 m Galileo telescope, attached at the Nasmyth focus. Bottom: Optical design and main opto-mechanical components of IFI. After the telescope focus the incoming beam is collimated through an achromatic lens doublet (I1) and then focused on the optical fiber (OF) with a second achromatic doublet (I2). A beam splitter (I3) is inserted in the collimated portion of the beam. S1, S2 and S3 are the corresponding opto-mechanical supports, and OC is the fiber connector. I3 reflects 8% of the incoming light towards a field camera (FC), and transmits the remaining 92% to the optical fiber. The focal lengths of the two doublets are f1 = 200 mm and f2 = 100 mm, leading to an overall demagnification of 1:2. The core of the (multimode) optical fiber has a diameter of 365 micrometers, that corresponds to 12.5 arcsec. The image of the field camera has a plate scale of 62.3 arcsec/mm and a field of view of 11.8 x 7.4 arcmin^2. Filters can be inserted in the collimated beam between I1 and I3.

injecting light into the instruments. To this end, one needs to carefully select the properties of the optical fiber and to insert additional optical elements. The light injection from the fiber into each instrument is realized by means of a dedicated opto-mechanical module (module Z), that acts as a focal multiplier. A module is placed in front of each instrument, and is properly centered and focussed. For Iqueye the magnification of this module is 2.5, while for Aqueye+ it is 2.

4. Scientific goals, experiments and projects

As mentioned above, one of the main goals of the AQUEYE+IQUEYE project is achieving tens of ps time resolution, needed to bring Quantum Optics concepts into the astronomical domain. We are pursuing it in exploratory experiments, in particular the measurement of the second order correlation of star light through a modern version of the Hanbury Brown and Twiss Intensity Interferometry experiment (Hanbury Brown et al. 1974 and references therein). In 2016 we started an experiment of stellar intensity interferometry on a km baseline using the Asiago telescopes and our instrumentation (Zampieri et al., 2016; Naletto et al., 2016). Nowadays, there is renewed interest for this technique because of the possibility of exploiting multiple and very long (km) baselines to image and resolve stellar environments on sub-milli-arcsec angular scales.

The other main goal of the project is performing optical High Time Resolution Astrophysics with ms or sub-ms time resolution to study rapidly varying phenomena in different types of astrophysical sources. We are pursuing it in a number of regular observing programs tailored to:

– Optical pulsars (in synergy with facilities operating at other wavelengths), to study with unprecedented accuracy their timing behaviour and pulse shape.

– Timing of optical transients and counterparts of binary systems with compact objects, to search for rapid optical variability.

– Lunar occultations (in synergy with other telescopes in Europe), to measure stellar radii/asymmetries with milli-arcsec angular resolution and determine the binary nature and separation of tight binary systems.

– Transits/occultations of Trans-Neptunian Objects, to determine their orbit and physical properties.

In the following we will report on recent results obtained from the first two programs.

Figure 2. Delay between the time of arrival of the main pulse of the Crab pulsar in the radio band and that in the optical band. Different points refer to measurements taken by different authors (as indicated) with different instruments since 1996. Results before year 2000 may be affected by significant systematic errors. We have been regularly monitoring this delay since 2008.

5. Scientific results

5.1. Very fast photometry (timing) of optical pulsars

Within this program we perform a regular monitoring of the Crab pulsar with both Aqueye+@Copernicus (e.g. Germanà et al. 2012) and IFI+Iqueye@Galileo. At present, this is the only regular optical monitoring program of the Crab pulsar and represents the optical analogue of the Jodrell Bank radio monitoring program^2. Observations of the Crab pulsar were taken also with Iqueye@NTT in two runs (Jan, Dec) in 2009 (Zampieri et al., 2014), when very fast photometry (timing) of a number of optical pulsars including PSRB 0540-69 (Fermi LAT Collaboration et al., 2015) and the Vela pulsar (Spolon et al., 2019), was carried out.

One of the main goals of this program is to study the evolution of the delay between the time of arrival of the main pulse in the radio band and that in the optical band. It is quite well established that, since at least the beginning of 2000, the pulse in the optical leads that in the radio by 150–250 μs (e.g. Oosterbroek et al. 2008 and references therein). Our most recent measurements, taken since 2008, confirm these findings (Figure 2; see Germanà et al. 2012; Zampieri et al. 2014). The optical and radio beams are probably misaligned (1.5–3 deg) because at the position where electrons emit optical photons the magnetic field has a slightly different orientation. Regular monitoring observations are carried out to

2http://www.jb.man.ac.uk/ pulsar/crab.html

search for a possible evolution of this delay, that may be induced by a significant reconfiguration of the magnetic field of the pulsar or by a change in the geometry of the emission region.

Besides a delay, the optical timing solution calculated on a timescale of a few days shows a significant drift from the radio ephemeris. This difference may be related to the optical measurements tracking the intrinsic daily/weekly pulsar noise (Čadež et al., 2016) and/or to dispersion measure variations not completely removed from radio data (while optical data do not depend on them). In this respect, optical data provide a robust and independent confirmation of the radio timing solution and a means to study the “typical” Crab pulsar frequency noise on a daily timescale. Another reason to monitor the timing history of the Crab pulsar in the optical band is to study its short term evolution after the occurrence of glitches and/or flares in the Crab nebula (e.g. Čadež et al. 2016).

5.2. Very fast photometric monitoring of optical transients

MAXI 1820+070 is a bright and uncatalogued X-ray transient source discovered on Mar 11, 2018 by Kawamuro et al. (2018), later identified with the optical transient ASASSN-18ey. The source was proposed to be a candidate black hole X-ray binary by Baglio et al. (2018). It shows pronounced and fast variability/flaring activity in both the X-ray and optical bands (Tucker et al., 2018).

After the discovery of the source, in April 2018 we promptly started a fastphotometry monitoring campaign with IFI+Iqueye and Aqueye+ (Zampieri et al., 2018a,b; Fiori et al., 2018). This effort was carried out in synergy with the SMARTNet multiwavelength network^3. A joint photometric and spectroscopic campaign was simultaneously undertaken with the Asiago and ANS Collaboration telescopes (Munari et al., 2018a,b). We found that, compared to a nearby reference star, in Apr and Jun 2018 the power spectrum of MAXI J1820+070 shows significant red noise and quasi periodic oscillations (QPOs).

The power spectrum of 3600s of data taken on Apr 18-19, 2018 is shown in Figure 3. We detect a significant quasi-periodic oscillation (QPO) on the top of three broad-band noise components (in part induced by the sky background; Zampieri et al. 2018a). The QPO has a centroid frequency of 128±2 mHz, a full-width-half-maximum of 24±5 mHz, and a fractional root-mean-square (rms) variability of 3.1±0.3%. Another QPO-like feature at a lower frequency and with lower significance is present in the power spectrum with a centroid frequency of 71±4 mHz, a full-width-half-maximum of 36±16 mHz, and a fractional rms variability of 3.2±0.6%. The properties (frequency and width) of the 128 mHz optical QPO are also consistent with those of the QPO at ∼0.12 Hz detected in the power spectrum of quasi-simultaneous Swift observations of MAXI J1820+070 taken between Apr 16 and 20, 2018. Furthermore, the 128 mHz QPO has a

3https://www.isdc.unige.ch/SMARTNet/

width consistent with that of the optical QPO reported in Yu et al. (2018). The frequency difference between the two measurements, that are approximately 3.7 days apart, is 29 mHz. The fractional increment of the centroid frequency is consistent with that calculated for a similar QPO detected in the X-rays with NuSTAR and reported in Buisson et al. (2018).

Figure 3. Power density spectrum (Lehay normalized) of MAXI 1820+070 taken with IFI+Iqueye on Apr 18-19, 2018 (Zampieri et al., 2018a). Four observations for a total duration of 3600s were considered. Power spectra were computed from the non-back-ground subtracted light curves with a time bin of 1 ms and were then averaged over intervals of 130s duration.

On June 9-10, 2018, we detected other two QPO-like features (Fiori et al., 2018). The power spectra of 4500s of data, calculated with a time bin of 1 ms and then averaged over intervals of 65s duration, show two broad peaks on the top of a broad-band noise component. The higher frequency QPO-like feature has a centroid frequency of 268±12 mHz, a full-width-half-maximum of 150±39 mHz, and a fractional rms variability of 1.9±0.2%. The lower frequency QPO is less significant and has a centroid frequency of 151±6 mHz, a full-width-half-maximum of 33±16 mHz, and a fractional rms variability of 1.2±0.3%. We obtained acceptable fits of the power spectrum also with two harmonically-related QPOs, that have width and significance similar to those reported above. Acceptable fits are obtained for 1:2, 2:3, or 3:5 centroid frequency ratios. A fit with harmomically-related QPOs performed on the April IFI+Iqueye observations gives similar results for the same harmonic ratios (1:2, 2:3 or 3:5).

The origin of the low frequency X-ray QPOs detected in black hole X-ray binaries has been matter of intense debate. They are thought to originate from the LenseThirring (LT) precession of the hot inner part of the accretion disc, tilted from the equatorial plane of the central rotating black hole (Ingram et al., 2009). The recent detection of QPOS in the optical and infrared band, in addition to the X-ray band, provides precious additional information to understand this phenomenon. Optical and infrared QPOs may be produced directly from the inner disc through synchrotron emission, modulated at the LT precession frequency (Veledina et al., 2015). Or, the inner disc undergoes LT precession and illuminates varying outer regions of the accretion disc, generating a reprocessed optical QPO (Veledina & Poutanen, 2015). If the optical/infrared emission comes from a jet launched from the accretion disc, jet precession/modulation may be driven by LT precession of the disc (Malzac et al., 2018).

6. Conclusions

Aqueye+ and IFI+Iqueye are two very fast photon counters operating in Asiago. They are used for performing very fast photometry of astrophysical sources and modern implementation experiments of the Hanbury Brown and Twiss Intensity Interferometer. Iqueye is fiber-fed through an independent instrument (IFI).

As part of our very-fast photometry observing programs, we have been regularly monitoring the Crab pulsar radio-optical delay since 2008. No significant variation of the delay has occurred, indicating that the relative position and geometry of the radio and optical emission regions have not changed. We carried out also a monitoring campaign of the X-ray transient MAXI J1820+070, detecting a number of QPOs in the power spectrum that will provide precious additional information on this phenomenon. We plan to continue the presently active experiments and observing programs, and to make Aqueye+@Copernicus fiber-fed and permanently available in the ToO mode. We may in principle export this technique for coupling instruments at other meter-class facilities.

Very fast optical multicolor photometry allows a variety of prime interest scientific questions to be addressed in the domain of High Time Resolution Astrophysics even with meter-class telescopes. Coordinated multi-wavelength campaigns most often benefit from the support of small telescopes world-wide to guarantee adequate temporal coverage. At the same time, forefront instrumentation allows for unique observations to be made. Highly experimental programs, technological development activities, and training of young astronomers can be run almost exclusively on such facilities.

Acknowledgements. We are grateful to all the staff of the Asiago observing station (Venerio Chiomento, Giancarlo Farisato, Aldo Frigo, Giorgio Martorana, Luciano Traverso, Robertino Bau’, Giovanni Costa, Alessandro Siviero) for their work and support. We also thank Marco Fiaschi, Tommaso Occhipinti, Enrico Verroi and Paolo Zoccarato for their external support to the project. This wok is based on observations

94 L. Zampieri et al.

collected at the Copernicus telescope (Asiago, Italy) of the INAF-Osservatorio Astronomico di Padova and at the Galileo telescope (Asiago, Italy) of the University of Padova. This project is partly supported by the University of Padova under the Quantum Future Strategic Project, by the Italian Ministry of University MIUR through the programme PRIN 2006, by the Project of Excellence 2006 Fondazione CARIPARO, by INAF-Astronomical Observatory of Padova under the grant “Osservazioni con strumentazione astronomica ad elevata risoluzione temporale e modellizzazione di emissione ottica variabile”, and by Fondazione Banca Popolare di Marostica-Volksbank.

References

Baglio, M. C., Russell, D. M., & Lewis, F., Optical observations of MAXI J1820+070 suggest it is a black hole X-ray binary. 2018, The Astronomer’s Telegram, 11418

Barbieri, C., Naletto, G., Occhipinti, T., et al., AquEYE, a single photon counting photometer for astronomy. 2009, Journal of Modern Optics, 56, 261, DOI: 10.1080/09500340802450565

Buisson, D., Fabian, A., Alston, W., et al., Exponential increase in X-ray QPO frequency with time in MAXI J1820+070. 2018, The Astronomer’s Telegram, 11578

Dravins, D., Barbieri, C., Fosbury, R. A. E., et al., QuantEYE: The Quantum Optics Instrument for OWL. 2005, ArXiv Astrophysics e-prints, astro-ph/0511027

Fermi LAT Collaboration, Ackermann, M., Albert, A., et al., An extremely bright gamma-ray pulsar in the Large Magellanic Cloud. 2015, Science, 350, 801, DOI: 10.1126/science.aac7400

Fiori, M., Zampieri, L., Burtovoi, A., et al., Other low-frequency optical QPO-like features in MAXI J1820+070 detected with IFI+IQUEYE@Galileo. 2018, The Astronomer’s Telegram, 11824

Germanà, C., Zampieri, L., Barbieri, C., et al., Aqueye optical observations of the Crab Nebula pulsar. 2012, Astron. Astrophys., 548, A47, DOI: 10.1051/0004- 6361/201118754

Hanbury Brown, R., Davis, J., & Allen, L. R., The Angular Diameters of 32 Stars.

1974, Mon. Not. R. Astron. Soc., 167, 121, DOI: 10.1093/mnras/167.1.121

Ingram, A., Done, C., & Fragile, P. C., Low-frequency quasi-periodic oscillations spectra and Lense-Thirring precession. 2009, Mon. Not. R. Astron. Soc., 397, L101, DOI: 10.1111/j.1745-3933.2009.00693.x

Kawamuro, T., Negoro, H., Yoneyama, T., et al., MAXI/GSC detection of a probable new X-ray transient MAXI J1820+070. 2018, The Astronomer’s Telegram, 11399

Malzac, J., Kalamkar, M., Vincentelli, F., et al., A jet model for the fast IR variability of the black hole X-ray binary GX 339-4. 2018, Mon. Not. R. Astron. Soc., 480, 2054, DOI: 10.1093/mnras/sty2006

Munari, U., Zampieri, L., Ochner, P., & Manzini, F., MAXI 1820+070 has completed the decline from the recent optical re-brightening following the soft to hard transition. 2018a, The Astronomer’s Telegram, 12157

Munari, U., Zampieri, L., Ochner, P., & Manzini, F., Short-lived episodes of emission line splitting in the candidate black hole X-ray binary MAXI 1820+070. 2018b, The Astronomer’s Telegram, 11899

Naletto, G., Barbieri, C., Occhipinti, T., et al., Iqueye, a single photon-counting photometer applied to the ESO new technology telescope. 2009, Astron. Astrophys., 508, 531, DOI: 10.1051/0004-6361/200912862

Naletto, G., Barbieri, C., Verroi, E., et al., Aqueye Plus: a very fast single photon counter for astronomical photometry to quantum limits equipped with an Optical Vortex coronagraph. 2013, in Proc. SPIE, Vol. 8875, Quantum Communications and Quantum Imaging XI, 88750D

Naletto, G., Zampieri, L., Barbieri, C., et al., A 3.9 km baseline intensity interferometry photon counting experiment. 2016, in Proc. SPIE, Vol. 9980, Quantum Communications and Quantum Imaging XIV, 99800G

Oosterbroek, T., Cognard, I., Golden, A., et al., Simultaneous absolute timing of the Crab pulsar at radio and optical wavelengths. 2008, Astron. Astrophys., 488, 271, DOI: 10.1051/0004-6361:200809751

Spolon, A., Zampieri, L., Burtovoi, A., et al., Timing analysis and pulse profile of the Vela pulsar in the optical band from Iqueye observations. 2019, Mon. Not. R. Astron. Soc., 482, 175, DOI: 10.1093/mnras/sty2605

Tucker, M. A., Shappee, B. J., Holoien, T. W.-S., et al., ASASSN-18ey: The Rise of a New Black Hole X-Ray Binary. 2018, Astrophys. J., Lett., 867, L9, DOI: 10.3847/2041-8213/aae88a Čadež, A., Zampieri, L., Barbieri, C., et al., What brakes the Crab pulsar? 2016, Astron. Astrophys., 587, A99, DOI: 10.1051/0004-6361/201526490

Veledina, A. & Poutanen, J., Reprocessing model for the optical quasi-periodic oscillations in black hole binaries. 2015, Mon. Not. R. Astron. Soc., 448, 939, DOI: 10.1093/mnras/stu2737

Veledina, A., Revnivtsev, M. G., Durant, M., Gandhi, P., & Poutanen, J., Discovery of correlated optical/X-ray quasi-periodic oscillations in black hole binary SWIFT J1753.5-0127. 2015, Mon. Not. R. Astron. Soc., 454, 2855, DOI: 10.1093/mnras/stv2201

Yu, W., Lin, J., Mao, D., et al., Further detection of the optical low frequency QPO in the black hole transient MAXI J1820+070. 2018, The Astronomer’s Telegram, 11591

Zampieri, L., Fiori, M., Burtovoi, A., et al., Low-frequency optical QPO in MAXI J1820+070 detected with IFI+IQUEYE@Galileo. 2018a, The Astronomer’s Telegram, 11723

Zampieri, L., Fiori, M., Burtovoi, A., et al., Optical timing observations of MAXI J1820+070 with IFI+IQUEYE and AQUEYE+ soon after state transition. 2018b, The Astronomer’s Telegram, 11936

Zampieri, L., Naletto, G., Barbieri, C., et al., Intensity interferometry with Aqueye+ and Iqueye in Asiago. 2016, in Proc. SPIE, Vol. 9907, Optical and Infrared Interferometry and Imaging V, 99070N

96 L. Zampieri et al.

Zampieri, L., Naletto, G., Barbieri, C., et al., Aqueye+: a new ultrafast single photon counter for optical high time resolution astrophysics. 2015, in Proc. SPIE, Vol. 9504, Photon Counting Applications 2015, 95040C

Zampieri, L., Čadež, A., Barbieri, C., et al., Optical phase coherent timing of the Crab nebula pulsar with Iqueye at the ESO New Technology Telescope. 2014, Mon. Not. R. Astron. Soc., 439, 2813, DOI: 10.1093/mnras/stu136